it	Locandina
en	Playbill

it	Data
en	Date

it	Test immucromatografico per l’indagine circa la presenza del virus SARS-CoV-2
en	Immucromatographic test for investigation about the presence of SARS-CoV-2 virus

it	Coupon

it	Test immucromatografico per l’indagine circa la presenza del virus SARS-CoV-2
en	Immucromatographic test for investigation about the presence of SARS-CoV-2 virus

it	Il Covid Check è un test immunocromatografico per l’indagine circa la presenza, all’interno dell’organismo, di antigeni del virus SARS-CoV-2. Si colloca nella prevenzione e screening rispetto alla valutazione della risposta immunitaria individuale a seguito di rilevazioni inerenti a antigeni e immunoglobuline. L’analisi è dedicata al riconoscimento dell’evoluzione del contagio e della malattia dei singoli soggetti.L’esame è effettuato tramite tampone antigenico prelevando campioni rinofaringei della persona.
en	The Covid Check is an immunochromatographic test for investigation about the presence, within the body, of antigens of the SARS-CoV-2 virus. It is placed in the prevention and screening with respect to the evaluation of individual immune response as a result of detections inherent to antigens and immunoglobulins. The analysis is dedicated to the recognition of the evolution of infection and disease of individual subjects.The examination is carried out by antigen swabbing by taking nasopharyngeal samples of the person.

it	Appuntamento, Data, OraArea Specializzazioni
en	Appointment, Date, TimeSpecialization Area